--
-- Table structure for table `iptables`
--

DROP TABLE IF EXISTS `iptables`;
CREATE TABLE `iptables` (
  `iptables_id` int(10) unsigned NOT NULL AUTO_INCREMENT,
  `server_id` int(10) unsigned NOT NULL DEFAULT '0',
  `table` varchar(10) DEFAULT NULL COMMENT 'INPUT OUTPUT FORWARD',
  `source_ip` varchar(16) DEFAULT NULL,
  `destination_ip` varchar(16) DEFAULT NULL,
  `protocol` varchar(10) DEFAULT 'TCP' COMMENT 'TCP UDP GRE',
  `singleport` varchar(10) DEFAULT NULL,
  `multiport` varchar(40) DEFAULT NULL,
  `state` varchar(20) DEFAULT NULL COMMENT 'NEW ESTABLISHED RECNET etc',
  `target` varchar(10) DEFAULT NULL COMMENT 'ACCEPT DROP REJECT LOG',
  `active` enum('n','y') NOT NULL DEFAULT 'y',
  PRIMARY KEY (`iptables_id`)
) ENGINE=MyISAM AUTO_INCREMENT=5 DEFAULT CHARSET=utf8;

